CMYK Intensity Level Representation Test

This test page (designed for ghostscript’s pcl3 driver) is intended for visually inspecting the representation of equally-spaced intensity levels.

Configuration for this test run Product: (revision 0) Interpreter version: 3010 Resolution: x pixels per inch This test run uses trivial transfer functions (no gamma correction).

Halftone type:

Test with 2 levels

Test with 43 levels

Test with 401 levels

Author: Martin Lottermoser $Id: levels-test.ps,v 1.14 2000/12/11 18:01:54 Martin Rel $